   KPG-67D Help File  Version 1.11
   File name: KPG67D_5.HLP


Digit Time Help
 DTMF Digit Time sets the time length of individual DTMF digits during
 the Autodial functions (PTT ID, Begin of TX ID, End of TX ID, etc.).
 This parameter and the Inter Digit Time sets the duty cycle normally
 setting the Digit Time equal to the Inter Digit Time (50/50 duty
 cycle) is sufficient.

Range  : 50 to 200 ms (10 ms steps)
Default: 50 ms

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2], or by directly entering a value.

Inter Digit Time Help
 DTMF Inter Digit Time sets the time between individual DTMF digits
 during the Autodial functions (PTT ID, Begin of TX ID, End of TX ID,
 etc.).
 This parameter with the Digit Time sets the duty cycle normally
setting the Digit Time equal the Inter Digit Time (50/50 duty
cycle) is sufficient.

Range  : 50 to 200 ms (10 ms steps)
Default: 50 ms

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2], or by directly entering a value.

First Digit Time Help
 DTMF First Digit Time sets the length of the first DTMF digit
longer than subsequent digits (for system/decoder attack
considerations).

Range  : 50 to 200 ms (10 ms steps)
Default: 50 ms

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2], or by directly entering a value.

First Digit Delay Help
 First Digit Delay sets the time delay between the start of transmit
 to sending the first DTMF digit (for system/decoder attack
 considerations).
 Making this value longer has a similar effect as setting the First
Digit Time longer.
 We recommend to set much longer if the station you want to call
has battery save function.
 Refer "Battery Save" feature in the optional features screen.

Range  : 100 to 1000 ms (50 ms steps)
Default: 100 ms

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2], or by directly entering a value.

Rise Time with QT Help
 Rise Time sets the time delay from the start of transmission to
sending the first DTMF digit (for system/decoder attack
considerations).
 This has the same effect as setting the First Digit Time longer.
 This function also works on DQT channels.

Range  : 100 to 1000 ms (50 ms steps)
Default: 100 ms

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2], or by directly entering a value.

Dial ID Help
For manually sending the pre-programmed BOT/EOT.

Enable : Enable the Dial ID function.
         BOT ID        :[*], [*]
         EOT ID        :[*], [#]
Disable: Disable the Dial ID function.
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

No. of DTMF Key Help
This function assigns the DTMF Key.

12 Keys: DTMF Key is assigned to the [0] to [9], [#] and [*] keys.
         4th column (A, B, C,and D) cannot be used for only DTMF
         manual encode keys.
16 Keys: DTMF Key is assigned to the [0] to [9], [A] to [D], [#]
         and [*] keys.
Default: 12 keys

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

DTMF Hold Time Help
DTMF Hold Time holds the transmitter keyed for two seconds after
releasing a DTMF key.
Press a DTMF key whether PTT is pressed or not, the radio maintains
the transmission approx. 2 seconds after releasing the DTMF button
even if PTT is released in DTMF manual operation.

On     : Enable the DTMF Hold Time function.
Off    : Disable the DTMF Hold Time function.
Default: On

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Keypad Auto-PTT Help
 This function allows the corresponding DTMF to be sent by simply
pressing a DTMF Keypad key ([0] to [9], [*] or [#]).
PTT is not required.

Enable : The corresponding DTMF is sent by pressing a DTMF Keypad
         key.
Disable: DTMF tones are not sent when only DTMF keys are pressed.
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Note 1:  If "Dial ID" is set to "Enable", "*" and "#" cannot be sent
         first.
Note 2:  When sending "*" first, press [*][*].
Note 3:  When sending "#" first, press [*][#].

Store & Send Help
Valid for keypad models only.
This function allows a preset DTMF Code (up to 16digits) to be sent
consecutively when [PTT] is pressed.
If DTMF keys are pressed other than during transmission, a display
appears showing the numbers of the keys pressed. If [PTT] is pressed
while this display is shown, the DTMF Code is output when [PTT] is 
pressed.

Enable : Enable the store & Send function
Disable: Disable the store & Send function
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

D Key Assignment Help
D Key Assignment allows the "D" symbol to be used as a pause period
in the Autodial, Begin of TX ID, End of TX ID, Store and Send DTMF
code strings.
"D Code" assignment means it is a DTMF "D".

Range  : D code/1 to 16 s (1 s steps)
Default: D code

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Auto Dial Memory Help
Up to 9 DTMF Codes (of up to 16 digits each) can be stored in memory.
The codes that can be entered as DTMF Codes are 0 to 9, A to D, *
 and #.


DTMF Signalling Help
Select from two types of DTMF decode schemes Code SQ or Selective
Call.
"CODE SQ" is the normal DTMF decode (3 digits (min.)
10 digits (max.)). 
Call Alert or Transpond is available as a decode response.
"Selective Call" is the special nine digit "structured" DTMF
selective calling format which can provide individual decode, 
five character status display. 

CODE SQ       : Code SQ controls audio mute, Call alert, and
                transpond.
                Program from 3 to 10 digits code for Code SQ per 
                channel in the channel edit screen.
                And, refer to the signalling AND/OR feature in the
                optional feature screen.

Selective Call: [128-Channel Models only]
                Selective Call function controls Audio mute, Call
                alert, Transpond, Status, and Display.
                4 digits DTMF (consists of 3 digits ID code set for
                each channel and 1 digit Intermediate Code) controls
                audio mute, Call alert, and transpond.
                The radio displays the data after the intermediate
                code 5 digits (max).
                Program 3 digits code for selective Call per channel
                in the channel edit screen and program 1 digit 
                intermediate code in the Edit-DTMF screen.
                Refer to the signalling AND/OR feature in the
                optional feature screen.
Default       : CODE SQ

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Intermediate Code Help
The single digit intermediate code, use as a distinguishing separator
between three digit ID code and a five digit (max) status code
should be displayed in the Selective Call Mode.
Refer to "Selective Call" in the Edit-DTMF screen.

Range  : 0-9/A-D/*/# (1Digit)
Default: #

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Group Code Help
A Group Code "wild card" character can be programmed as
DTMF characters A, B, C, D, "*", or "#".
If the radio receives a valid ID code with one to all of it's digits
substituted with this "wild card" Group Code, it will decode.
This provides multiple group and subgroup calling.
The group call using this Group Code is effective in either Code SQ,
or Selective Call feature.
The called station by Group Call does not transpond.

for example,
Group Code C
              (A) (B) (C) (D)
waiting Code  123 223 235 355

The base calls using "C23", then (A) and (B) receive this call.
The base calls using "CC5", then (C) and (D) receive this call.
The base calls using "CCC", then all stations receive this call.

Range  : Off/A-D/*/# (1 Digit)
Default: Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Auto Reset Timer Help
Automatically resets the DTMF decoder and mutes speaker audio
within a programmable period after a valid decode.
This frees the user from having to manually reset with the monitor
or squelch key.
The timer starts after carrier drops.

Range  : Off/1 to 15 s (1 s steps)
Default: 10 s

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2], or by directly entering a value.

Call Alert/Transpond Help
After a valid DTMF decode, one of the following radio response
can be programmed.

Off       : No audible call alert.
            Radio unmutes.
            Displays "CALL" on the LCD.
Call Alert: Call alert in speaker audio.
            Radio unmutes.
            Displays "CALL" on the LCD.
Transpond : Radio transponds programmed contents.
            Refer to "Transpond" in the Edit-DTMF screen.
            Then the radio unmutes.
            Displays "CALL" on the LCD.
            The radio does not transpond when called by Group
            Call.
            Refer to "Clear to Transpond" feature in the Optional
            feature screen.
Default   : Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Transpond Help
You can set up the contents of Transpond.

 Alert (tone)  : "Alert" will transpond.
 ID Code       : The code (same as the received ID code) will
                 transpond, and sounds from the radio.
 Transpond Code (Autodial Memory 1):
                 The contents memorized in "Auto Dial Memory 1" will
                 transpond, and sounds from the radio.
                 "Autodial Memory 1" must be programmed for DTMF
                 transpond to work.
 Default       : Alert.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Dead Beat Disable (TX) Help
The Dead Beat Disable (D.B.D.) Code (TX) consists of three to ten
characters and is programmable.
The characters that can be entered are 0 to 9, A to D, * and #.
In all channels, reception of this code activates the Transpond
function, then places the transceiver in D.B.D.(TX) mode.
While in D.B.D.(TX) mode, transmit is inhibited until a D.B.D.(TX) 
Code followed by "#" resets this function.

Type the desired code with the keyboard, then press [Enter].

Note:  There is no display that indicates the D.B.D.(TX) Code has been
       received.

Dead Beat Disable (TX&RX) Help
The Dead Beat Disable (D.B.D.) Code (TX&RX) consists of three to ten
characters and is programmable.
The characters that can be entered are 0 to 9, A to D, * and #.
In all channels, reception of this code activates the Transpond
function, then places the transceiver in D.B.D.(TX&RX) mode.
While in D.B.D.(TX&RX) mode, transmit is inhibited until a 
D.B.D.(TX&RX) Code followed by "#" resets this function.

Type the desired code with the keyboard, then press [Enter].

Note:  Displays "LOCK" when the D.B.D.(TX&RX) Code has been 
       received.

A Tone Help
Enter the required Frequency for 2-Tone Selective Call.

Range  : 288.5 - 2840.0 [Hz]
Default: 321.7 [Hz]

B Tone Help
Enter the required Frequency for 2-Tone Selective Call.

Range  : 288.5 - 2840.0 [Hz]
Default: 928.1 [Hz]

C Tone Help
Enter the required Frequency for 2-Tone Selective Call.

Range  : 288.5 - 2840.0 [Hz]
Default: 600.9 [Hz]

Decoder Call Format Help
Select the Combination of tone.

Range  : A-B, C-B, C-A, B-C, B-A, A-C
Default: A-B

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Group Call Help
Group call decode can be programmed for A Tone or B Tone or C Tone. 
Receiving 5 seconds of a single A Tone or B Tone will initiate the 
same decode alert sequence as a normal 2-Tone call.
The Transpond function does not engage when group call is used.

A Tone : A Tone is selected.
B Tone : B Tone is selected.
C Tone : C Tone is selected.
None   : Disable the Group call function.
Default: None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Alert Tone/Transpond Help
Selects the transceiver response when a 2-Tone Selective Call has 
occurred.
The Transpond function does not work when a Group Call.

Alert Tone: Individual call
                Sounds a short beep tone three times. 
            Group Call
                Sounds a very short beep tone seven times.
Transpond : The transceiver transmits a long beep tone one time.
            The operator cannot hear it.
None      : No Alert Tone and no Transpond.
Default   : None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Auto Reset Timer Help
Automatically resets the 2-Tone decoder and mutes the speaker audio
this time after a valid decode. This frees the user from having to
manually reset with the monitor or squelch key. The timer starts 
after the carrier drops.

Range  : off(0) to 300 sec. (1 sec steps)
Default: 10 sec.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2], or by directly entering a value.


A/N (2-TONE Encode) Help
Enter the required characters for A/N.
(maximum 8 digits)
The codes that can be programmed are:
 (space)  % + = ( ) @ \ _ $ # * - / 0 1 2 3 4 5 6 7 8 9
 A B C D E F G H I J K L M N O P Q R S T U V W X Y Z

A TONE (2-TONE Encode) Help
Enter the required Frequency for 2-Tone Selective Call.
When setting only A Tone or B Tone, it can use as group call.

Range  : 288.5 - 3200 [Hz]
Default: 321.7 [Hz]

B TONE (2-TONE Encode) Help
Enter the required Frequency for 2-Tone Selective Call.
When setting only A Tone or B Tone, it can use as group call.

Range  : 288.5 - 3200 [Hz]
Default: 928.1 [Hz]

GAP Time (2-TONE Encode) Help
GAP Time sets the time between individual Tone during the 
2-Tone Encode.

Range  : 0 to 375 ms (1 ms steps)
Default: 0 ms

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2], or by directly entering a value.

5-Tone Standard Help
Select the type of 5-Tone code.
The selected 5-Tone Standard is used for 5-Tone encoding and
decoding.

Range  :EEA, ZVEI, CCIR, ZVEI-2, EIA, Kenwood
Default:EEA

Tone Period
You can program the period of each tone for decoding/encoding
5-Tone.
If you select "Tone" in 5-Tone Standard menu, the ideal value is 
automatically set.

Range  :20 to 255ms (in step of 1ms)
Default:EEA         40ms
        ZVEI        70ms
        CCIR       100ms
        ZVEI-2      70ms
        EIA         33ms
        Kenwood     70ms

Receive Gap Period
You can program the required silent (no-tone) time of decoding the
tone after the last valid tone has been received.
The recommended value for the receive gap period is 1.5 time of the
duration of the tone. For example, 150ms for CCIR 100ms tone.
If you select "Tone" in 5-Tone Standard menu, the program
automatically set the ideal value for Receive Gap Period.

Range  : 0 to 640ms (in steps of 1ms)
Default: = Tone Period x 1.5 times

First Tone Period
You can program the length of First Tone.

Range  :20 to 5000ms (in steps of 1ms)
Default: = Tone Period

'F' No-tone Period
You can program the No-Tone period.
  Using in Encode
    Transmission will continue with No-Tone by this period.
  Using in Decode
    Receive Gap Period will be extend by this period.
    For example,
    Gap Period = 150ms, 'F' Period = 300ms,  Decode = 5F87
    -> Gap Period to decode 5 = 150ms
       Gap Period to decode 8 = 150ms + 300ms
       Gap Period to decode 7 = 150ms

Range  :0 to 7000ms (in steps 1ms)
Default: = Tone Period x 3 times

Auto Reset Timer
You can program the wait time to mute the speaker after the 
transceiver receives 5-Tone and opens the squelch.
Auto Reset Timer starts counting down the time when the squelch
unmutes by pressing [Monitor] key or ending of the transmission.

Range  :Off, 1 to 300s (in steps 1s)
Default:10s

Note:  Stun mode is not reset by Auto Reset Timer.

Delay TX On Time
You can program the delay time from start of transmission and
to start of code (5-Tone) generation.

Range  :0 to 7000ms (in steps 1ms)
Default: = Tone period x 3 times

Delay TX Off Time
You can program the delay time from end of sending code (5-Tone)
to end of transmission.

Range  :0 to 7000ms (in steps 1ms)
Default: = Tone period x 3 times

Note:  If 0ms is set for Delay TX Off Time and QT/DQT is set to
       using channel, 
       transceiver sends codes (5-Tone), QT Reverse
       Burst/DQT Turn Off Code, then stops transmission.

'T' External Single Tone Help
You can transmit a single tone frequency for the 5-Tone Encode
that 'T' code is selected. See the 5-Tone Encode/Decode menu for
the 5-Tone Encode feature.

Range  : 300 to 3000 Hz (in steps of 1 Hz)
Default: 1000 Hz

Note 1:  The 'T' code cannot be configured unless the 5-tone Encode 
         is selected.
Note 2:  'T' tone period time is follows the "Tone Period" or "First
         Tone Period".

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2], or by directly entering a value.

Next Decode Wait Help
You can program the wait time for decoding the next 2-frame 5-Tone 
after the first frame of the 5-Tone matches the programmed 5-Tone
code.

Range  : 0 - 2550 mseconds (in steps of 10 ms.)
Default: 1600 ms

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2], or by directly entering a value.

Kenwood Format Help
You can create the original 5-Tone set.
The sample tone set is stored as KENWOOD Tone.

Tone : 300 to 3000Hz

Group Tone Help
You can select Group Tone Code. If select '0S' or 'AS', the radio
decode 'Dec1', 'Dec2' and 'Dec1'+'Dec2' (2 frame 5-Tone) code.

Code   : Off,0,A,0S,AS
Default: A

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2].

Note 1:  When '0S' or 'AS' is selected, the code for Dec2, in the
         channel data, must be configured.
Note 2:  If 'Dec1' or 'Dec2' select to 'None' and 'Group Tone Code'
         select to '0S' or 'AS', the radio decode the group tone code
         same as '0' or 'A' is selected.

Group Digit Selectable Help
Press [Selcall Entry] or 10 Key to enter Selcall Entry mode.
You can program whether the Group Digit can be selected or not
in Selcall Entry mode.


LED Condition (Signalling) Help
In the LED Condition (Signalling), you can select the call display/LED 
 status.

Timed  : After the Auto Reset Time expires, the Call indicator and LED 
         disappears.
Manual : Even after the Auto Reset Time expires, the Call indicator
         and LED status are retained until the user operates a key.
Alert  : The Call indicator and LED status are retained while the 
         Alert tone sounds in the 'No. of Passes' configuration mode.
Default: Timed

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2].

Note 1:  When 'Alert' is selected, the Alert tone may stop before 
         the Auto Reset Time expires, depending on the value
         configured in the 'No. of Passes', and the Call indicator
         and LED disappear when the Auto Reset Time expires.
Note 2:  Even if the 'No. of Passes' configured, sounds the Group
         Call Alert tone at 1 time.
Note 3:  If the LED Condition (Signalling) is set to 'Manual' or
         'Alert' in the 8CH portable transceiver, and if the
         transceiver receives a 5-Tone call, monitor closes after the
         Auto Reset Time expires and the LED continues to blink orange
         in accordance with the 'Manual' or 'Alert' settings.

Selectable Selcall Digit
This parameter is used to define the number of digits that is
entered by keypad.

Range   : None, 1 to 5
Default : None

Monitor Function Help
You can program either QT/DQT or 5-Tone decoding to be canceled
when [Monitor] or [Monitor Momentary] key is pressed.
When Monitor function is activated, "MON" icon appears.

QT/DQT : Cancels the decoding in Channel Information - QT/DQT Decode
         Menu. The squelch is controlled by the signal carrier only.
5-Tone : Cancels the decoding in Channel Edit - Decode menu.
         The squelch is controlled by QT/DQT in "Channel Information - 
         QT/DQT Decode" menu only.
         If QT/DQT is programmed in "Channel Information - QT/DQT
         Decode menu, incoming signal must match the QT/DQT code to
         open the squelch.

Default: 5-Tone

Start Up Monitor Help
You can program whether activates or not the Monitor function 
when Start Up (Power On).

Default: Disable

Mute Monitor tone Help
You can program the tone that deactivates the Monitor function.
When transceiver receives this tone for "Min. Mute Tone Period" or 
followed 5-Tone decode code by this tone, transceiver deactivates the
Monitor function.

Range  :Off, B, C, D
Default:Off

Min. Mute Tone Period Help
You can program the effective length of Mute Monitor tone.
Mute Monitor function will effect when incoming 
Mute Monitor tone length is longer than this parameter.

Range  :20 to 7000ms (in steps 5ms)
Default: = Tone Period x 3 times

5-Tone (2)

PTT ID Control Help
In the PTT ID Control, you can select to transmit the BOT and EOT
encode according the monitor status.

Each PTT : The PTT ID is transmitted even if the Monitor is set to
           open.
Mon.Close: The PTT ID is transmitted while the Monitor is set to
           close.
Default  : Each PTT

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2].

Note :  If the radio has 'PTT ID Control=Mon.Close' and "PTT ID Mon.=
        Open' the PTT ID will be send only the PTT is pressed the
        first time and never more until 'Auto Reset Timer' expire.

Number of Start UP ID
You can enter a maximum of 5 digits in the range of 0 to 9.
The number will be executed as 'M' digit value in the 5-Tone
Encode/Decode menu.

Range  : Off, 1 to 5
Default: Off

<Method to enter>
1.Enter the Start Up ID from the numeric keys.
2.Press the [SCN](Mobile)/[Open Circle](Portable) key.

My ID Text Help
My ID Text will be displayed when you enter My ID entry mode.
Enter the desired character using the keyboard, then press [Enter].

Keypad Text Help
Keypad Text will be displayed when you enter Selcall entry mode.
Enter the desired character using the keyboard, then press [Enter].

Queue Text Help
Queue Text will be displayed when the transceiver shows variable
digit stored by 'Q'.
Enter the desired character using the keyboard, then press [Enter].

5Tone Encode/Decode
            TEST DATA BY KE

Encode A Help
The Encode A parameter is used for encoding 5-Tone signalling.

Range  : 0 to 20 digits (0-9, A-F, K, M, Q, T)
Default: 12345

Note 1:
    F: No-Tone Period
    K:The last digits entered using the keypad will be generated as 
       tones.
      (up to the "Selectable Selcall Digit" parameter)
    Q:The last decoded 'Q' tone will be generated as tones.
      (up to 5 digits)
    M:Start Up ID will be generated as tones.
    T:You selected single tone frequency will be generated as tone.
      (See the 5-Tone (1) menu for the 'T' External Single Tone
      feature.)
Note 2:
    'K' and 'M' are not available on NO display model.


Encode B Help
The Encode B parameter is used for encoding 5-Tone signalling.

Range  : 0 to 20 digits (0-9, A-F, K, M, Q, T)
Default: Blank

Note 1:
    F: No-Tone Period
    K:The last digits entered by keypad will be generated as tone.
      (up to "Selectable Selcall Digit" parameter)
    Q:The last decoded 'Q' tone will be generated as tone.
      (up to 5 digits)
    M:Start Up ID will be generated as tone.
    T:You selected single tone frequency will be generated as tone.
      (See the 5-Tone (1) menu for the 'T' External Single Tone
      feature.)

Note 2:
    'K' and 'M' are not available on NO display model.


Encode C Help
The Encode C parameter is used for encoding 5-Tone signalling.

Range  : 0 to 20 digits (0-9, A-F, K, M, Q, T)
Default: Blank

Note 1:
    F: No-Tone Period
    K:The last digits entered by keypad will be generated as tone.
      (up to "Selectable Selcall Digit" parameter)
    Q:The last decoded 'Q' tone will be generated as tone.
      (up to 5 digits)
    M:Start Up ID will be generated as tone.
    T:You selected single tone frequency will be generated as tone.
      (See the 5-Tone (1) menu for the 'T' External Single Tone
      feature.)

Note 2:
    'K' and 'M' are not available on NO display model.


Encode D Help
The Encode D parameter is used for encoding 5-Tone signalling.

Range  : 0 to 20 digits (0-9, A-F, K, M, Q, T)
Default: Blank

Note 1:
    F: No-Tone Period
    K:The last digits entered by keypad will be generated as tone.
      (up to "Selectable Selcall Digit" parameter)
    Q:The last decoded 'Q' tone will be generated as tone.
      (up to 5 digits)
    M:Start Up ID will be generated as tone.
    T:You selected single tone frequency will be generated as tone.
      (See the 5-Tone (1) menu for the 'T' External Single Tone
      feature.)

Note 2:
    'K' and 'M' are not available on NO display model.


Encode E Help
The Encode E parameter is used for encoding 5-Tone signalling.

Range  : 0 to 20 digits (0-9, A-F, K, M, Q, T)
Default: Blank

Note 1:
    F: No-Tone Period
    K:The last digits entered by keypad will be generated as tone.
      (up to "Selectable Selcall Digit" parameter)
    Q:The last decoded 'Q' tone will be generated as tone.
      (up to 5 digits)
    M:Start Up ID will be generated as tone.
    T:You selected single tone frequency will be generated as tone.
      (See the 5-Tone (1) menu for the 'T' External Single Tone
      feature.)

Note 2:
    'K' and 'M' are not available on NO display model.


Encode F Help
The Encode F parameter is used for encoding 5-Tone signalling.

Range  : 0 to 20 digits (0-9, A-F, K, M, Q, T)
Default: Blank

Note 1:
    F: No-Tone Period
    K:The last digits entered by keypad will be generated as tone.
      (up to "Selectable Selcall Digit" parameter)
    Q:The last decoded 'Q' tone will be generated as tone.
      (up to 5 digits)
    M:Start Up ID will be generated as tone.
    T:You selected single tone frequency will be generated as tone.
      (See the 5-Tone (1) menu for the 'T' External Single Tone
      feature.)

Note 2:
    'K' and 'M' are not available on NO display model.


Encode G Help
The Encode G parameter is used for encoding 5-Tone signalling.

Range  : 0 to 20 digits (0-9, A-F, K, M, Q, T)
Default: Blank

Note 1:
    F: No-Tone Period
    K:The last digits entered by keypad will be generated as tone.
      (up to "Selectable Selcall Digit" parameter)
    Q:The last decoded 'Q' tone will be generated as tone.
      (up to 5 digits)
    M:Start Up ID will be generated as tone.
    T:You selected single tone frequency will be generated as tone.
      (See the 5-Tone (1) menu for the 'T' External Single Tone
      feature.)

Note 2:
    'K' and 'M' are not available on NO display model.


Encode H Help
The Encode H parameter is used for encoding 5-Tone signalling.

Range  : 0 to 20 digits (0-9, A-F, K, M, Q, T)
Default: Blank

Note 1:
    F: No-Tone Period
    K:The last digits entered by keypad will be generated as tone.
      (up to "Selectable Selcall Digit" parameter)
    Q:The last decoded 'Q' tone will be generated as tone.
      (up to 5 digits)
    M:Start Up ID will be generated as tone.
    T:You selected single tone frequency will be generated as tone.
      (See the 5-Tone (1) menu for the 'T' External Single Tone
      feature.)

Note 2:
    'K' and 'M' are not available on NO display model.


Decode A Help
The Decode A parameter is used for decoding 5-Tone signalling.

Range  : 0 to 16 digits (0-9, A-F, K, M, Q)
Default: 12345

Note 1:
    F:No-Tone Period
    K:The last digits entered by keypad will be compared as tone
      number.
      (up to "Selectable Selcall Digit" parameter)
    Q:The digits decoded 'Q' is stored and these number will be
      displayed.
    M:Start up ID will be compared as tone number.

Note 2:
    'K' and 'M' are not available on NO display model.

Note 3:
     When using both Dec 1 and Dec 2, if the shorter code is part
     of the longer code, add 'FF' (the terminate code) to the end
     of the shorter code to avoid decoding errors.
       
     example:
            Decode code      Data entry
     Dec 1: 12345F123QQ ---> 12345F123QQ
     Dec 2: 123QQ       ---> 123QQFF


Decode B Help
The Decode B parameter is used for decoding 5-Tone signalling.

Range  : 0 to 16 digits (0-9, A-F, K, M, Q)
Default: Blank

Note 1:
    F:No-Tone Period
    K:The last digits entered by keypad will be compared as tone
      number. 
      (up to "Selectable Selcall Digit" parameter)
    Q:The digits decoded 'Q' is stored and these number will be
      displayed.
    M:Start up ID will be compared as tone number.

Note 2:
    'K' and 'M' are not available on NO display model.

Note 3:
     When using both Dec 1 and Dec 2, if the shorter code is part
     of the longer code, add 'FF' (the terminate code) to the end
     of the shorter code to avoid decoding errors.
       
     example:
            Decode code      Data entry
     Dec 1: 12345F123QQ ---> 12345F123QQ
     Dec 2: 123QQ       ---> 123QQFF

Decode C Help
The Decode C parameter is used for decoding 5-Tone signalling.

Range  : 0 to 16 digits (0-9, A-F, K, M, Q)
Default: Blank

Note 1:
    F:No-Tone Period
    K:The last digits entered by keypad will be compared as tone
      number.
      (up to "Selectable Selcall Digit" parameter)
    Q:The digits decoded 'Q' is stored and these number will be
      displayed.
    M:Start up ID will be compared as tone number.

Note 2:
    'K' and 'M' are not available on NO display model.

Note 3:
     When using both Dec 1 and Dec 2, if the shorter code is part
     of the longer code, add 'FF' (the terminate code) to the end
     of the shorter code to avoid decoding errors.
       
     example:
            Decode code      Data entry
     Dec 1: 12345F123QQ ---> 12345F123QQ
     Dec 2: 123QQ       ---> 123QQFF

Decode D Help
The Decode D parameter is used for decoding 5-Tone signalling.

Range  : 0 to 16 digits (0-9, A-F, K, M, Q)
Default: Blank

Note 1:
    F:No-Tone Period
    K:The last digits entered by keypad will be compared as tone
      number. 
      (up to "Selectable Selcall Digit" parameter)
    Q:The digits decoded 'Q' is stored and these number will be
      displayed.
    M:Start up ID will be compared as tone number.

Note 2:
    'K' and 'M' are not available on NO display model.

Note 3:
     When using both Dec 1 and Dec 2, if the shorter code is part
     of the longer code, add 'FF' (the terminate code) to the end
     of the shorter code to avoid decoding errors.
       
     example:
            Decode code      Data entry
     Dec 1: 12345F123QQ ---> 12345F123QQ
     Dec 2: 123QQ       ---> 123QQFF

Decode E Help
The Decode E parameter is used for decoding 5-Tone signalling.

Range  : 0 to 16 digits (0-9, A-F, K, M, Q)
Default: Blank

Note 1:
    F:No-Tone Period
    K:The last digits entered by keypad will be compared as tone
      number.
      (up to "Selectable Selcall Digit" parameter)
    Q:The digits decoded 'Q' is stored and these number will be
      displayed.
    M:Start up ID will be compared as tone number.

Note 2:
    'K' and 'M' are not available on NO display model.

Note 3:
     When using both Dec 1 and Dec 2, if the shorter code is part
     of the longer code, add 'FF' (the terminate code) to the end
     of the shorter code to avoid decoding errors.
       
     example:
            Decode code      Data entry
     Dec 1: 12345F123QQ ---> 12345F123QQ
     Dec 2: 123QQ       ---> 123QQFF

Decode F Help
The Decode F parameter is used for decoding 5-Tone signalling.

Range  : 0 to 16 digits (0-9, A-F, K, M, Q)
Default: Blank

Note 1:
    F:No-Tone Period
    K:The last digits entered by keypad will be compared as tone
      number.
      (up to "Selectable Selcall Digit" parameter)
    Q:The digits decoded 'Q' is stored and these number will be
      displayed.
    M:Start up ID will be compared as tone number.

Note 2:
    'K' and 'M' are not available on NO display model.

Note 3:
     When using both Dec 1 and Dec 2, if the shorter code is part
     of the longer code, add 'FF' (the terminate code) to the end
     of the shorter code to avoid decoding errors.
       
     example:
            Decode code      Data entry
     Dec 1: 12345F123QQ ---> 12345F123QQ
     Dec 2: 123QQ       ---> 123QQFF

Remote Stun
When the transceiver is received the Stun code, it enters Stun mode.
The transceiver cannot be operate.
"LOCK" appears on the display during Stun mode only on Display Model.

Range  : 0 to 16 digits (0-9, A-F, K, M, Q)
Default: Blank

Remote Revive
Revive the transceiver in Stun mode.
When the transceiver is received the Revive code, the transceiver 
becomes operational again.

Range  : 0 to 16 digits (0-9, A-F, K, M, Q)
Default: Blank

Primary Code Help
The Primary Code is generally programmed with an individual Paging
Code that is unique to each subscriber unit.
The Primary Code consists of a four digit number that is contained
in the SmarTrunk II digital transmission.
Any four digit number from 0000 to 9999 may be used.

Range  : 0000 to 9999
Default: 0000

Type the required code directly.

"SmarTrunk & SmarTrunk II are registered trademarks of
SmarTrunk Systems, Inc., Hayward, California, U.S.A.".

Secondary Code Help
The Secondary Code is used to receive group calls.
Any four digits number from 0000 to 9999 may be used.

Blank  : No change to the data set in the Trunking Board.
Range  : 0000 to 9999
Default: 0000

Type the required code directly.

Priority Subscriber Enable Help
Enabling the Priority Subscriber Enable makes a subscriber unit a
Priority Subscriber.
A Priority Subscriber can pre-empt calls currently in progress on the
trunking system.
Care must be exercised when using this feature.
A priority subscriber can terminate important calls of other
subscribers.
If too many priority subscribers are enabled, the priority
subscribers themselves will be competing for trunking channels.
Additional trunking channels should be installed if the system is
heavily loaded.

Enable : Enables the Priority Subscriber Enable function.
Disable: Disables the Priority Subscriber Enable function.
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

System Tone Help
This program code sets the sub audible System Tone that is used in
a trunking system. The subscriber units in the trunking system can
use this tone to detect that a trunking channel is busy. 
When a Busy Channel Detect is set to System Tone, all subscriber 
units must be programmed in the Trunking Board.

Range  : 0 to 6
Default: 3

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2], or by directly entering a value.

Trunking System ID Number Help
All subscriber units on a trunking system must be programmed with
the same trunking system ID number.
All subscriber units in the same group must have the same Trunking 
System ID Number.
For example, if a subscriber unit with a trunking system ID number
of 1 tries to access a trunking system with trunking system ID
number of 5, access will be denied.
If you wish to allow subscriber units to roam on different
Trunking systems, all trunking system ID numbers must be identical.

Range  : 0 to 31
Default: 0

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2], or by directly entering a value.

Lower Block Decode Help
Any four digit number from 0000 to 9999 may be used.
The subscriber unit will receive calls placed to any Paging Codes
within the Block Decode.
When the Lower Block Decode is programmed, the Upper Block Decode
is automatically set to the same value.
A Block Decode range of up to 20 Paging Codes may then be defined
by programming the Upper Block Decode.

 Range  : 0000 to 9999
 Default: 0000

Type the required code directly.

Note:  The Block Decode feature is used to receive any group calls
       placed to a defined range of Paging Codes.
       Block Decode is enabled by programming the Lower Block Decode
       to the lowest Paging Code of the desired range and the Upper
       Block Decode to the highest Paging Code of the range.
       Up to 20 Paging Code can be included in the range.

Upper Block Decode Help
The subscriber unit will receive calls placed to any Paging Codes
within the Block Decode.

 Range  : 0000 to 9999
 Default: 0000

Type the required code directly.

Note:  The Block Decode feature is used to receive any group calls
       placed to a defined range of Paging Codes.
       Block Decode is enabled by programming the Lower Block Decode
       to the lowest Paging Code of the desired range and the Upper
       Block Decode to the highest Paging Code of the range.
       Up to 20 Paging Code can be included in the range.

Busy Channel Detect Help
System Tone : Subscriber units normally determine the trunking channel
              is busy by detection of the sub-audible system tone.
Carrier     : This is done by programming Trunking Module to use RF
              carrier for detection of a busy channel.
Default     : System Tone

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Automatic PTT Mode Help
The Automatic PTT Mode makes radio operation simple for the 
subscriber.
When this mode enable, the subscriber simply presses the transmit
switch on the transceiver to gain channel access.
The Trunking Board will automatically call the subscriber's selected
Group Code for dispatch type trunking.
No keypad entry is required to operate in this mode.

Enable : Enables the Auto PTT Mode function
Disable: Disables the Auto PTT Mode function
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Emergency Call Override Help
When a subscriber places an emergency call by using routing code 0,
the Trunking Board will dial the preprogrammed emergency phone number
on line 1.
If all channels are busy and Emergency Call Override is enabled, it
will automatically begin a priority call override function to dial
the emergency phone number.

Enable : Enables the Emergency Override function.
Disable: Disables the Emergency Override function.
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Clear Channel Alerting Mode Help
Clear channel alerting mode notifies the subscriber when a radio
channel becomes available after access failure by repeater busy.

Enable : Enables the Clear Channel Alert function.
Disable: Disables the Clear Channel Alert function.
Default: Disable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Radio-kill Help
The Radio Kill Status is used to reactivate a transceiver that has 
been remotely disabled with the Radio Kill function from the 
SmarTrunk II Digital Trunking Controller.

Active   : Enables the Radio Kill function.
Disactive: Disables the Radio Kill function.
Default  : Active

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

"SmarTrunk & SmarTrunk II are registered trademarks of
SmarTrunk Systems, Inc., Hayward, California, U.S.A.".

Memory Speed-dialing Programming Help
The Memory Speed Dial Programming controls a subscriber's ability to
program speed dial and Turbo SpeeDial numbers.
If enabled, the subscriber can program Memory Speed Dial numbers using
the transceiver's keypad.
If it is disabled, the subscriber can not program Memory Speed Dial 
numbers.
This does not prevent a subscriber from Memory Speed Dialing if 
numbers have been programmed.
The system operator can pre-program some Memory Speed Dial numbers
for the subscriber, then call the system operator's programmed 
numbers.

 Enable : Enables the Memory Speed Dialing Programming function.
 Disable: Disables the Memory Speed Dialing Programming function.
 Default: Enable

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Speed Dial Help
[Speed Dial]
Up to ten Speed Dial numbers may be programmed.

[Turbo SpeeDial]
Up to four Turbo SpeeDial numbers may be programmed.

Type the required number directly.

Trunking Group Code Help
Group Codes are used to place and receive group calls when the 
Automatic PTT Mode is enable.
When the subscriber presses PTT, a call is placed to the current 
Group Code.
Any four digit number from 0000-9999 may be used for each Group Code.

[128-Channel Models]
Up to 16 Group Codes may be programmed in the SmarTrunk Module.

When programming multiple Group Codes, begin with Group Code 0 and
progress up (Group Code 1,2,3...) to a maximum of 16 Group Codes.

"SmarTrunk & SmarTrunk II are registered trademarks of
SmarTrunk Systems, Inc., Hayward, California, U.S.A.".

Five Digit Access Code Help
The access code allows the dealer to enter the Trunking Board
programming mode and keeps others from surreptitiously using the
programming mode.
The access code can be programmed 
in the Trunking/Password/Five Digit Access Code window,
and may be set to any five digit number 00000 to 99999.
Be sure to write down the new access code. 
If the access code is lost or forgotten, access to the Trunking
Board programming mode will be impossible.
"*****" is displayed on the screen.

Range  : 00000 to 99999

Test Frequency Help
The transceiver can be programmed with Test Frequencies for alignment 
purposes. 
(See the Service Manual for details) 

Enter the desired value directly, then press enter.

Embedded Message Help
This function allows you to program up to a 64 alphanumeric character 
message into the transceiver. This can be used for an electric serial
number, program file name notation, property ID., etc.. The entered 
message is visible while running the KPG-67D software and prints out 
on paper.
Also,it will appear when executing Read function. The Embedded Message
will be displayed only if a Data Password is programmed on the radio.

1. When "Embedded message" is selected, the "Embedded message" window
   opens.
2. Enter up to 32 alphanumeric characters, then press [Enter]. The 
   cursor move to the lower column.
3. Enter up to 32 alphanumeric characters.
4. Press [Alt] or [Esc].

Receive Frequency Help
Receive-only channels are allowed.
Frequencies can only be programmed using the proper step size.
See the frequency range of the selected model in the upper area of the
Channel Information screen.

Enter the required receive frequency directly.

To delete channel data, 
 a)Place the cursor on the channel's receive frequency.
 b)Press and hold the <Delete> key until the receive
   frequency is erased.
 c)Hit <Enter>.
The channel data will be erased and left blank.
New channel data can be manually entered.

Transmit Frequency Help
Frequencies can only be programmed using the proper step size.
See the frequency range of the selected model in the upper area of the
Channel Information screen.

Enter the required transmit frequency directly.

QT/DQT Decode Help
 QT : 67.0 to 254.1Hz (in steps of 0.1Hz)
 DQT: 000 to 777
      (defaul: normal) 
      enter D###N (normal)
            D###I (inverted)
Enter the value directly.
   ex1. QT           [1][5][1][.][4][ENTER] for 151.4Hz
   ex2. DQT normal   [D][0][2][3][N][ENTER] or 
                     [D][0][2][3][ENTER] for 023 normal
   ex3. DQT inverted [D][7][5][4][I][ENTER] for 754 inverted
        -or-
Press [F2] to open the QT/DQT list, then select your desired code.
 QT : 67.0 to 250.3Hz
 DQT: 023 to 754 


QT/DQT Encode Help
 QT : 67.0 to 254.1Hz (in steps of 0.1Hz)
 DQT: 000 to 777
      (default: normal) 
      enter D###N (normal)
            D###I (inverted)
Enter the value directly.
   ex1. QT           [1][5][1][.][4][ENTER] for 151.4Hz
   ex2. DQT normal   [D][0][2][3][N][ENTER] or 
                     [D][0][2][3][ENTER] for 023 normal
   ex3. DQT inverted [D][7][5][4][I][ENTER] for 754 inverted
        -or-
Press [F2] to open the QT/DQT list, then select your desired code.
 QT : 67.0 to 250.3Hz
 DQT: 023 to 754 


Channel Name Help
Enter up to 8 alphanumeric characters to name each channel. 
The characters that can be entered are: 
 (space) % + = ( ) @ \ _ $ # * - / 0 1 2 3 4 5 6 7 8 9
 A B C D E F G H I J K L M N O P Q R S T U V W X Y Z
The group name specified here is displayed on the transceiver when 
"Optional features/Display Character" is set to "Channel Name". 
It is also displayed when [Display Character] is pressed and
group#/channel# is toggled to channel name.

Refer to "Group Name Text Size" in the Optional features screen.
Channel Name Text Size becomes (8 - Group Name Text Size) of the
transceiver display.

The RX frequency must be entered before the channel name.
Type the desired name with the keyboard, then press [Enter].

Option Signalling Help
Valid for DTMF or 2-Tone Decode only.

Allows the use of DTMF or 2-Tone signals to call individual stations.

DTMF/2-Tone:
    Enable the Option Signalling function.
    Squelch remains muted with a carrier while the station waits for
    reception of Option Signalling.  When Option Signalling matches,
    Squelch unmutes (see "Signalling" AND/OR ).
None:
    Disable the Option Signalling function.
    When a carrier is present, Squelch unmutes.
Default: None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Note:  Option Signalling deactivates when transmitting (pressing PTT), 
       upon activation (receiving - releasing PTT) Option Signalling 
       automatically enters the matched condition.

ID Help
This is the sequence code as station ID for waiting for
DTMF signalling.
Before program these codes, select "DTMF signalling"
Code SQ or Selective Call in the Edit-DTMF screen.

Code SQ
 Range  : 000 to 9999999999 (1 steps)
          Set 3 digits (min.) to 10 digits (max.).
 Default: 000

Selective Call
 Range  : 000 to 999 (1 steps)
          Set 3 digits.
 Default: 000

Busy Channel Lockout Help
TX is inhibited when the channel is busy.

 1    : Do not transmit when the transceiver is receiving the carrier.
        Transmit when the transceiver is not receiving the carrier.
 2    : Do not transmit when the transceiver is receiving the carrier
        and QT/DQT code does not match.
        Transmit when the transceiver is not receiving the carrier or
        receiving the QT/DQT code matches.
 No   : Do not use Busy Channel Lockout.
 Default : No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Beat Shift Help
Shifts the microprocessor system clock frequency
per channel to prevent interference.

Yes    : Shift the microprocessor system clock frequency.
No     : Do not Shift the microprocessor system clock frequency.
Default: No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

TX Power Help
This function sets the transceiver RF Power.

High   : RF Power High
Low    : RF Power Low
Default: High

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Wide/Narrow Help
Select W5k/W4k for each channel.

W5k    : Wide 5k Bandwidth.
W4k    : Wide 4k Bandwidth.
Default: W5k

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Scan Delete/Add Help
Select DEL/ADD for each channel.

DEL    : Deletes the Channel from the SCAN map.
ADD    : Adds the Channel to the SCAN map.
Default: ADD

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Priority Channel Help
Fixed Priority select function.
If the Priority Channel is set to Fixed, select a Priority channel
before writing to the transceiver or saving to the database.
Refer to Priority setting in the scan information screen.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Home Channel Help
The transceiver jumps to a programmed Home Channel by pressing the
Home Channel function key instead of the channel up/down. 
Set the Home Channel function to one of the programmable keys 
in the Key Assignment screen, and select a Home channel before 
writing to the transceiver or saving to the database.

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Compander Help
This function reduces the noise on the communication channel used by 
the transceiver and improves reception.
Compander function works only Narrow bandwidth channel.

Yes    : Enable the Compander function
No     : Disable the Compander function
Default: No

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Note:  If "Wide" is selected, compander function will be disabled
       automatically.

Scrambler Help
This parameter can only be used when a scrambler unit is installed in 
the transceiver.

This function activates a scrambler unit that renders the contents of 
your communications intelligible only to those who are using the same 
scrambler unit.
Set the scrambler code (1 to 16) in this parameter. When the 
code is set, "AUX" icon(Mobile 128ch) or dot(Mobile 8ch/Portable) 
appears at the transceiver display.
If you do not wish to use the scrambler function, set to "Off" 
("AUX" icon or dot is not displayed).  

Range  : Off, 1 to 16 (steps of 1)
Default: Off

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

PTT ID Help
--- DTMF/2-Tone Model ---
PTT ID Provides a DTMF ANI to be sent with every PTT 
(Beginning of Transmit, End of Transmit, or Both).
Programmable per channel Off/BOT/EOT/Both in the channel
Info. screen - PTT ID column.

Range  : Off, BOT, EOT, Both
Default: Off

--- 5-Tone Model ---
PTT ID Provides a 5-Tone ANI to be sent with every PTT 
(Beginning of Transmit, End of Transmit, or Both).
Programmable per channel Off/BOT/EOT/Both in the channel
Info. screen - PTT ID column.

Range  : Off, BOT, EOT, Both
Default: Off

Note :  The encode transmission can be cancelled if the parameter
        'PTT ID Control' is set to 'Mon.Close' and monitor status
        is open before press PTT.

Begin of TX Help
--- DTMF/2-Tone Model ---
The Begin of TX ID is an ID (up to 16 digits) that can be used to 
access the Conventional Repeater and additional circuits inside the 
Repeater.
If the transmitted ID matches the Repeater ID, you can use the
Repeater and additional circuits inside the Repeater.
The codes that can be specified are 0 to 9, A to D, * and #.

Enter the desired code using the keyboard, then press [Enter].

--- 5-Tone Model ---
You can select the sending code for Begin of TX of PTT ID.
The code is programmed in Edit 5-Tone Encode/Decode screen.

Range  : None, Encode A-H
Default: None

Note :  The encode transmission can be cancelled if the parameter
        'PTT ID Control' is set to 'Mon.Close' and monitor status
        is open before press PTT.


End of TX Help
--- DTMF/2-Tone Model ---
The End of TX ID is an ID (up to 16 digits) that can be used to
release access of the Conventional Repeater and additional circuits
inside the Repeater.
If the transmitted ID matches the Repeater ID, the Repeater and
additional circuits inside the Repeater close access.
The codes that can be specified are 0 to 9, A to D, * and #.

Enter the desired code using the keyboard, then press [Enter].

--- 5-Tone Model ---
You can select the sending code for End of TX of PTT ID.
The code is programmed in Edit 5-Tone Encode/Decode screen.

Range  : None, Encode A-H
Default: None

Note :  The encode transmission can be cancelled if the parameter
        'PTT ID Control' is set to 'Mon.Close' and monitor status
        is open before press PTT.


Dec 1 Help
You can select the waiting code for selectable call.
The code is programmed in Edit 5-Tone Encode/Decode screen.

Range  : None, Decode A-F
Default: Decode A

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2].

Note:  When using both Dec 1 and Dec 2, if the shorter code is part
       of the longer code, add 'FF' (the terminate code) to the end
       of the shorter code to avoid decoding errors.
       
       example:
              Decode code      Data entry
       Dec 1: 12345F123QQ ---> 12345F123QQ
       Dec 2: 123QQ       ---> 123QQFF

Dec 2 Help
You can select the waiting code for selectable call.
The code is programmed in Edit 5-Tone Encode/Decode screen.

Range  : None, Decode A-F
Default: None

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2].

Note:  When using both Dec 1 and Dec 2, if the shorter code is part
       of the longer code, add 'FF' (the terminate code) to the end
       of the shorter code to avoid decoding errors.
       
       example:
              Decode code      Data entry
       Dec 1: 12345F123QQ ---> 12345F123QQ
       Dec 2: 123QQ       ---> 123QQFF

Call 1 Help
You can select the sending code by using [Call 1] key
for calling operators party.
The code is programmed in Edit 5-Tone Encode/Decode screen.

Range  : None, Encode A-H
Default: Encode A

Call 2 Help
You can select the sending code by using [Call 2] key
for calling operators party.
The code is programmed in Edit 5-Tone Encode/Decode screen.

Range  : None, Encode A-H
Default: None

Trsp Help
You can select the transpond code as acknowledge after called.
The code is programmed in Edit 5-Tone Encode/Decode screen.

Range  : None, Encode A-H
Default: None

PTT ID Mon. Help

Select to open the monitor when the PTT ID is transmitted.

Open   : Opens the monitor when the PTT ID is transmitted.
Disable: Does not open the monitor when the PTT ID is transmitted.
Default: Open

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2].

Call1 Mon. Help
Select to open the monitor when the Call 1 is transmitted.

Open   : Opens the monitor when the Call 1 is transmitted.
Disable: Does not open the monitor when the Call 1 is transmitted.
Default: Open

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2].

Call2 Mon. Help
Select to open the monitor when the Call 2 is transmitted.

Open   : Opens the monitor when the Call 2 is transmitted.
Disable: Does not open the monitor when the Call 2 is transmitted.
Default: Open

Select the desired value by pressing [SPACE BAR], [Shift]+[SPACE BAR], 
[F2], or [Shift]+[F2].

Group Name Help
Enter up to 8 alphanumeric characters.
The characters that can be entered are: 
 (space)  % + = ( ) @ \ _ $ # * - / 0 1 2 3 4 5 6 7 8 9 
 A B C D E F G H I J K L M N O P Q R S T U V W X Y Z

Type the desired name with the keyboard, then press [Enter].

Refer to "Group Name Text Size" in the Optional features screen.

Group Delete/Add Help
This parameter selects "Delete" or "Add" for the group.
If "Del" is selected, the transceiver will not scan any channel in the 
group.

Add    : Included in the scan sequence
Del    : Not included in the scan sequence
Default: Add

Note:  This parameter is effective when the "Group Scan" setting in
       the Scan Information screen is set to "Multi".
 
Select the desired value by pressing [SPACE BAR],[Shift]+[SPACE BAR],
[F2], or [Shift]+[F2].

Channel Copy
Copies the entire channel data to another channel.
Use SHIFT + F3 to copy a channel.
Frequency Copy Help
Copies a channel's RX frequency to the TX scolumn.
Use SHIFT + F4 to copy a frequency.
QT/DQT Copy Help
Copies a channel's Decode QT/DQT to the Encode column.
Use Shift + F5 to copy Decode QT/DQT.

Group Copy Help
Copies the entire group data to another group.
Use shift + F8 to copy a group.

Note:  KPG-67D also copies the contents of "Group Feature"
       and "Channel Information" to a destination group
       using the Group Copy function.



Signalling Decode Type Help
You can configure the decoder format for the transceiver.
DTMF/2-TONE : DTMF, 2-Tone
5-TONE      : 5-Tone



2-Tone Help

End Of Help File
