Comm Port ID:                 1 of 1

The purpose of this field is to
identify the communications port to
use for programming the radio.
There are only two ports available
for this purpose: COM1 and  COM2.
Enter a 1 here to select COM1 and a
2 to select COM2.  This field will
not accept a comm port ID of a port
that does not exist.
