Change Directory:                                                    1 of 1

This is the change directory window.  The purpose of this window is to
solicit the name of the directory to which the change is to be made.

From this window your options are:
   
   F1 - Select this option if you want to:
        Proceed with the change.

   F2 - Select this option if you want to:
        Abort this procedure.
