File to edit:                 1 of 1

This field is used to enter the name
of the file to be changed/edited.
This is an eight character alpha-
numeric field and will accept any
valid DOS file name provided the
file exists in the current direct-
oty.  Once a name is entered, select
F1 to change the file and F2 to
abort the operation.
