Frequencies:                  1 of 1

The transmit/receive frequencies for
this channel are entered in this
field.  Valid frequencies lie within
the specified band split and are
evenly divisible by the channel
spacing.  For VHF, channel spacing
may be either .005 or .00625.  For
UHF and 800 MHz, the channel spacing
is .0125.
