Hang After PTT Release:       1 of 2

Toggle Yes or No using the Tab key.
The default is Yes.

Yes:
   The scan hang time will be
   applied after PTT is released.

No:
   The radio will immediately resume
   scanning when PTT is released.

                              2 of 2
            **** Note ****
The off-hook scan option must be
enabled to use this option with the
microphone off-hook.  Otherwise all
scanning stops when the mic is 
off-hook.
