Output To:                    1 of 2

This is a toggle field that is used
to identify where the printed out-
put should go.  There are three
available options:  'Printer',
'Screen', and 'File'.  Using the TAB
key, toggle this field until your
selection is displayed and press F1
to generate the print.  Choose
'Printer' if you want the printed
output to go to the printer.  Select
'Screen' if you want the output to
                              2 of 2
go to the screen, and 'File', if you
want the output generated in an
ASCII file format.
