Off-Hook Scan Enable:         1 of 2

Toggle No or Yes using the Tab key.
The default is No.

No:
   The radio stops scanning when the
   microphone is removed from the
   hook-switch bracket.

Yes:
   The radio will not alter its scan
   when the microphone is removed
                              2 of 2
   from the hookswitch bracket.
   The radio will either transmit on
   the receive channel or revert to
   selected channel depending on the
   programming of the Scan Transmit
   Channel.
