Scan Hang Time:               1 of 1

Programmable from 0.3 to 5.0 seconds
in 0.1 second steps ( normal default
time is 2.0 seconds ).  The scan
hang time is applied after the
carrier on an active channel
disappears and after releasing the
transmitter PTT.  If no other
channel activity occurs during this
time, scanning will resume.
