Scan Transmit Channel:        1 of 3

Toggle Rx CH or Sel CH using the Tab
key.  Default is Sel CH.

Rx CH:
   (On-hook) - When the radio is
   receiving a channel, the radio 
   will transmit on that channel.
   The radio will transmit on the 
   SELECTED channel if not receiving
   a channel.                

                              2 of 3
   (Off-hook) - If the radio is 
   receiving a channel and the 
   microphone comes off-hook the
   radio will stay on the receive 
   channel and stop scanning.
          **** Note ****
   This is only if Off-Hook scan is
   not enabled.

Sel CH:
   (On-hook) - The radio will always
   transmit on the SELECTED channel.
                              3 of 3  
   (Off-hook) - The radio will 
   revert to the selected channel
   and stop scanning when the 
   microphone comes off-hook.
          **** Note ****
   This is only if Off-Hook scan is
   not enabled.
