Type 99 Tone Tables:                                                 1 of 2

The format of the tone table, GE format or non-GE format, and the tone
frequencies may be programmed in this window.

To program a tone table:

1.  Move the cursor to the appropriate table format field.
2.  Press Tab to change the format if desired.
3.  Press <Enter> to move the cursor to the Tone A field.
4.  Enter the tone frequency, if desired (from 288.5 to 1433.4).
5.  Press <Enter> to move the cursor to the Tone B field.
6.  Enter the tone frequency, if desired (from 288.5 to 1433.4).
                                                                     2 of 2

7.  Enter all required tones for the decode type to be selected.
